[#V2Transport-GetSendMemoryUsage]
= xref:V2Transport.adoc[V2Transport]::GetSendMemoryUsage
:relfileprefix: ../
:mrdocs:

Return the memory used by buffered send data&period;

== Synopsis

Declared in `&lt;net&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
&lsqb;&lsqb;requires&lowbar;capability(0x7f950efa80e8), requires&lowbar;capability(0x7f950eb89308), requires&lowbar;capability(0x7f950ae3aa18), requires&lowbar;capability(0x7f9502e7d918), requires&lowbar;capability(0x7f952353c498), requires&lowbar;capability(0x7f94f8652a68), requires&lowbar;capability(0x7f9522f6ae08), requires&lowbar;capability(0x7f950ef0b478), requires&lowbar;capability(0x7f951f0c0928), requires&lowbar;capability(0x7f95080678b8), requires&lowbar;capability(0x7f952271a618)&rsqb;&rsqb;
virtual
size&lowbar;t
GetSendMemoryUsage() const noexcept override;
----

== Return Value

the number of bytes held in send buffers&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
