[#TxRequestTracker-PostGetRequestableSanityCheck]
= xref:TxRequestTracker.adoc[TxRequestTracker]::PostGetRequestableSanityCheck
:relfileprefix: ../
:mrdocs:

Run a time&hyphen;dependent internal consistency check (testing only)&period;

== Synopsis

Declared in `&lt;txrequest&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
PostGetRequestableSanityCheck(std::chrono::microseconds now) const;
----

== Description

This can only be called immediately after GetRequestable, with the same &apos;now&apos; parameter&period;

== Parameters

[cols="1,4"]
|===
| Name| Description
| *now*
| The same current time that was passed to the preceding GetRequestable call&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
