[#TxGraph-IsOversized]
= xref:TxGraph.adoc[TxGraph]::IsOversized
:relfileprefix: ../
:mrdocs:

Determine whether the graph is oversized (contains a connected component of more than the configured maximum cluster count)&period; Some of the functions below are not available for oversized graphs&period; The mutators above are always available&period; Removing a transaction by destroying its Ref while staging exists will not clear main&apos;s oversizedness until staging is aborted or committed&period;

== Synopsis

Declared in `&lt;txgraph&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
virtual
bool
IsOversized(xref:TxGraph/Level.adoc[Level] level) noexcept = 0;
----

== Return Value

True if the selected graph is oversized&period;

== Parameters

[cols="1,4"]
|===
| Name| Description
| *level*
| Which graph (main or staging) to query&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
