[#ToLower-0c]
= ToLower
:mrdocs:

Converts the given character to its lowercase equivalent&period; This function is locale independent&period; It only converts uppercase characters in the standard 7&hyphen;bit ASCII range&period; This is a feature, not a limitation&period;

== Synopsis

Declared in `&lt;util&sol;strencodings&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
constexpr
char
ToLower(char c);
----

== Return Value

the lowercase equivalent of c&semi; or the argument if no conversion is possible&period;

== Parameters

[cols="1,4"]
|===
| Name| Description
| *c* [in]
| the character to convert to lowercase&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
