[#TIMEOUT_INTERVAL]
= TIMEOUT&lowbar;INTERVAL
:mrdocs:

Time after which to disconnect, after waiting for a ping response (or inactivity)&period;

== Synopsis

Declared in `&lt;net&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr std::chrono::minutes TIMEOUT&lowbar;INTERVAL = TIMEOUT&lowbar;INTERVAL&lcub;20&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
