[#TAPROOT_CONTROL_MAX_NODE_COUNT]
= TAPROOT&lowbar;CONTROL&lowbar;MAX&lowbar;NODE&lowbar;COUNT
:mrdocs:

Maximum number of Merkle branch nodes in a control block&period;

== Synopsis

Declared in `&lt;script&sol;interpreter&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr size&lowbar;t TAPROOT&lowbar;CONTROL&lowbar;MAX&lowbar;NODE&lowbar;COUNT = 128;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
