[#StdMutex-native_handle_type]
= xref:StdMutex.adoc[StdMutex]::native&lowbar;handle&lowbar;type
:relfileprefix: ../
:mrdocs:

== Synopsis

Declared in `&lt;util&sol;stdmutex&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
typedef &lowbar;&lowbar;libcpp&lowbar;mutex&lowbar;t* native&lowbar;handle&lowbar;type;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
