[#StdMutex-Guard-mutex_type]
= xref:StdMutex.adoc[StdMutex]::xref:StdMutex/Guard.adoc[Guard]::mutex&lowbar;type
:relfileprefix: ../../
:mrdocs:

== Synopsis

Declared in `&lt;util&sol;stdmutex&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
typedef xref:StdMutex.adoc[StdMutex] mutex&lowbar;type;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
