[#SignOptions-sighash_type]
= xref:SignOptions.adoc[SignOptions]::sighash&lowbar;type
:relfileprefix: ../
:mrdocs:

The signature hash type applied when signing&period;

== Synopsis

Declared in `&lt;script&sol;sign&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
int sighash&lowbar;type = &lcub;SIGHASH&lowbar;DEFAULT&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
