[#SetRPCWarmupStatus]
= SetRPCWarmupStatus
:mrdocs:

Set the RPC warmup status&period; When this is done, all RPC calls will error out immediately with RPC&lowbar;IN&lowbar;WARMUP&period;

== Synopsis

Declared in `&lt;rpc&sol;server&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
SetRPCWarmupStatus(std::string const& newStatus);
----

== Parameters

[cols="1,4"]
|===
| Name| Description
| *newStatus*
| Human&hyphen;readable description of the current warmup step&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
