[#Serialize-0ef]
= Serialize
:mrdocs:

Deleted overload that forbids serializing char&semi; use uint8&lowbar;t or int8&lowbar;t instead&period;

== Synopsis

Declared in `&lt;serialize&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
template&lt;
    typename Stream,
    xref:CharNotInt8.adoc[CharNotInt8] V&gt;
void
Serialize(
    Stream& s,
    V v) = delete;
----

== Parameters

[cols="1,4"]
|===
| Name| Description
| *s*
| The output stream&period;
| *v*
| The char value that must not be serialized&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
