[#ScriptExecutionData-m_validation_weight_left]
= xref:ScriptExecutionData.adoc[ScriptExecutionData]::m&lowbar;validation&lowbar;weight&lowbar;left
:relfileprefix: ../
:mrdocs:

How much validation weight is left (decremented for every successful non&hyphen;empty signature check)&period;

== Synopsis

Declared in `&lt;script&sol;interpreter&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
int64&lowbar;t m&lowbar;validation&lowbar;weight&lowbar;left;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
