[#ScriptExecutionData-m_codeseparator_pos]
= xref:ScriptExecutionData.adoc[ScriptExecutionData]::m&lowbar;codeseparator&lowbar;pos
:relfileprefix: ../
:mrdocs:

Opcode position of the last executed OP&lowbar;CODESEPARATOR (or 0xFFFFFFFF if none executed)&period;

== Synopsis

Declared in `&lt;script&sol;interpreter&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
uint32&lowbar;t m&lowbar;codeseparator&lowbar;pos;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
