[#STANDARD_LOCKTIME_VERIFY_FLAGS]
= STANDARD&lowbar;LOCKTIME&lowbar;VERIFY&lowbar;FLAGS
:mrdocs:

Used as the flags parameter to sequence and nLocktime checks in non&hyphen;consensus code&period;

== Synopsis

Declared in `&lt;policy&sol;policy&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr unsigned int STANDARD&lowbar;LOCKTIME&lowbar;VERIFY&lowbar;FLAGS = &lcub;LOCKTIME&lowbar;VERIFY&lowbar;SEQUENCE&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
