[#RPCMethod-IsValidNumArgs]
= xref:RPCMethod.adoc[RPCMethod]::IsValidNumArgs
:relfileprefix: ../
:mrdocs:

If the supplied number of args is neither too small nor too high

== Synopsis

Declared in `&lt;rpc&sol;util&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
IsValidNumArgs(size&lowbar;t num&lowbar;args) const;
----

== Return Value

True if the count is valid for this method&period;

== Parameters

[cols="1,4"]
|===
| Name| Description
| *num&lowbar;args*
| The number of arguments supplied&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
