[#RPCIsInWarmup]
= RPCIsInWarmup
:mrdocs:

Report whether the RPC server is still warming up&period;

== Synopsis

Declared in `&lt;rpc&sol;server&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
RPCIsInWarmup(std::string* outStatus);
----

== Return Value

True while warmup is in progress&period;

== Parameters

[cols="1,4"]
|===
| Name| Description
| *outStatus*
| If non&hyphen;null, set to the current warmup status message&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
