[#Params]
= Params
:mrdocs:

Return the currently selected parameters&period; This won&apos;t change after app startup, except for unit tests&period;

== Synopsis

Declared in `&lt;chainparams&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:CChainParams.adoc[CChainParams] const&
Params();
----

== Return Value

The currently selected chain parameters&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
