[#Now]
= Now
:mrdocs:

Return the current time point cast to the given precision&period; Only use this when an exact precision is needed, otherwise use T&colon;&colon;clock&colon;&colon;now() directly&period;

== Synopsis

Declared in `&lt;util&sol;time&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
template&lt;typename T&gt;
T
Now();
----

== Return Value

The current time point of T&colon;&colon;clock cast to T&apos;s duration&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
