[#MockableSteadyClock-mock_time_point]
= xref:MockableSteadyClock.adoc[MockableSteadyClock]::mock&lowbar;time&lowbar;point
:relfileprefix: ../
:mrdocs:

Time point type used to store the mocked time, in milliseconds&period;

== Synopsis

Declared in `&lt;util&sol;time&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
using mock&lowbar;time&lowbar;point = std::chrono::time&lowbar;point&lt;MockableSteadyClock, std::chrono::milliseconds&gt;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
