[#MockableSteadyClock-duration]
= xref:MockableSteadyClock.adoc[MockableSteadyClock]::duration
:relfileprefix: ../
:mrdocs:

== Synopsis

Declared in `&lt;util&sol;time&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
typedef nanoseconds duration;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
