[#MockableSteadyClock-INITIAL_MOCK_TIME]
= xref:MockableSteadyClock.adoc[MockableSteadyClock]::INITIAL&lowbar;MOCK&lowbar;TIME
:relfileprefix: ../
:mrdocs:

Starting value used when mocking begins&period;

== Synopsis

Declared in `&lt;util&sol;time&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr static
mock&lowbar;time&lowbar;point::duration INITIAL&lowbar;MOCK&lowbar;TIME = INITIAL&lowbar;MOCK&lowbar;TIME&lcub;1&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
