[#MillisecondsDouble]
= MillisecondsDouble
:mrdocs:

Duration of milliseconds stored as a double&period;

== Synopsis

Declared in `&lt;util&sol;time&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
using MillisecondsDouble = std::chrono::duration&lt;double, std::chrono::milliseconds::period&gt;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
