[#MUSIG2_PUBNONCE_SIZE]
= MUSIG2&lowbar;PUBNONCE&lowbar;SIZE
:mrdocs:

Size in bytes of a serialized MuSig2 public nonce&period;

== Synopsis

Declared in `&lt;musig&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr size&lowbar;t MUSIG2&lowbar;PUBNONCE&lowbar;SIZE = &lcub;66&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
