[#MEMPOOL_REPRESENTATION_THRESHOLD]
= MEMPOOL&lowbar;REPRESENTATION&lowbar;THRESHOLD
:mrdocs:

Minimum fraction of block weight that must come from the mempool for it to be well represented&period;

== Synopsis

Declared in `&lt;policy&sol;fees&sol;mempool&lowbar;estimator&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
constexpr double MEMPOOL&lowbar;REPRESENTATION&lowbar;THRESHOLD = 0&period;75;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
