[#MAX_WAIT_FOR_IO]
= MAX&lowbar;WAIT&lowbar;FOR&lowbar;IO
:mrdocs:

Maximum time to wait for I&sol;O readiness&period; It will take up until this time to break off in case of an interruption&period;

== Synopsis

Declared in `&lt;util&sol;sock&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr auto MAX&lowbar;WAIT&lowbar;FOR&lowbar;IO = 1s;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
