[#MAX_STANDARD_SCRIPTSIG_SIZE]
= MAX&lowbar;STANDARD&lowbar;SCRIPTSIG&lowbar;SIZE
:mrdocs:

The maximum size of a standard ScriptSig

== Synopsis

Declared in `&lt;policy&sol;policy&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr unsigned int MAX&lowbar;STANDARD&lowbar;SCRIPTSIG&lowbar;SIZE = &lcub;1650&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
