[#MAX_STANDARD_P2WSH_SCRIPT_SIZE]
= MAX&lowbar;STANDARD&lowbar;P2WSH&lowbar;SCRIPT&lowbar;SIZE
:mrdocs:

The maximum size in bytes of a standard witnessScript

== Synopsis

Declared in `&lt;policy&sol;policy&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr unsigned int MAX&lowbar;STANDARD&lowbar;P2WSH&lowbar;SCRIPT&lowbar;SIZE = &lcub;3600&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
