[#MAX_SIZE]
= MAX&lowbar;SIZE
:mrdocs:

The maximum size of a serialized object in bytes or number of elements (for eg vectors) when the size is encoded as CompactSize&period;

== Synopsis

Declared in `&lt;serialize&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr uint64&lowbar;t MAX&lowbar;SIZE = 0x02000000;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
