[#MAX_SCRIPTCHECK_THREADS]
= MAX&lowbar;SCRIPTCHECK&lowbar;THREADS
:mrdocs:

Maximum number of dedicated script&hyphen;checking threads allowed

== Synopsis

Declared in `&lt;validation&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr int MAX&lowbar;SCRIPTCHECK&lowbar;THREADS = &lcub;15&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
