[#MAX_P2SH_SIGOPS]
= MAX&lowbar;P2SH&lowbar;SIGOPS
:mrdocs:

Maximum number of signature check operations in an IsStandard() P2SH script

== Synopsis

Declared in `&lt;policy&sol;policy&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr unsigned int MAX&lowbar;P2SH&lowbar;SIGOPS = &lcub;15&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
