[#MAX_OP_RETURN_RELAY]
= MAX&lowbar;OP&lowbar;RETURN&lowbar;RELAY
:mrdocs:

Default setting for &hyphen;datacarriersize in vbytes&period;

== Synopsis

Declared in `&lt;policy&sol;policy&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr unsigned int MAX&lowbar;OP&lowbar;RETURN&lowbar;RELAY = MAX&lowbar;STANDARD&lowbar;TX&lowbar;WEIGHT &sol; WITNESS&lowbar;SCALE&lowbar;FACTOR;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
