[#MAX_FEELER_CONNECTIONS]
= MAX&lowbar;FEELER&lowbar;CONNECTIONS
:mrdocs:

Maximum number of feeler connections

== Synopsis

Declared in `&lt;net&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr int MAX&lowbar;FEELER&lowbar;CONNECTIONS = 1;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
