[#MAX_DUST_OUTPUTS_PER_TX]
= MAX&lowbar;DUST&lowbar;OUTPUTS&lowbar;PER&lowbar;TX
:mrdocs:

Maximum number of ephemeral dust outputs allowed&period;

== Synopsis

Declared in `&lt;policy&sol;policy&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr unsigned int MAX&lowbar;DUST&lowbar;OUTPUTS&lowbar;PER&lowbar;TX = &lcub;1&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
