[#LockStackEmpty]
= LockStackEmpty
:mrdocs:

Check whether the current thread holds no tracked critical sections&period;

== Synopsis

Declared in `&lt;sync&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
LockStackEmpty();
----

== Return Value

true if the lock stack is empty&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
