[#LOCKTIME_THRESHOLD]
= LOCKTIME&lowbar;THRESHOLD
:mrdocs:

Threshold for nLockTime&period;

== Synopsis

Declared in `&lt;script&sol;script&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr unsigned int LOCKTIME&lowbar;THRESHOLD = &lcub;500&apos;000&apos;000&rcub;;
----

== Description

Below this value nLockTime is interpreted as a block number, otherwise as a UNIX timestamp&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
