[#InsecureRandomContext-result_type]
= xref:InsecureRandomContext.adoc[InsecureRandomContext]::result&lowbar;type
:relfileprefix: ../
:mrdocs:

Result type of the generator, for the UniformRandomBitGenerator concept&period;

== Synopsis

Declared in `&lt;random&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
typedef uint64&lowbar;t result&lowbar;type;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
