[#InitError-06]
= InitError
:mrdocs:

Show error message with additional detail lines&period;

== Synopsis

Declared in `&lt;node&sol;interface&lowbar;ui&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
InitError(
    xref:bilingual_str.adoc[bilingual&lowbar;str] const& str,
    std::vector&lt;std::string&gt; const& details);
----

== Return Value

Always false, so callers can return it directly to signal failure&period;

== Parameters

[cols="1,4"]
|===
| Name| Description
| *str*
| The error message to display&period;
| *details*
| Extra lines of detail shown alongside `str&period;`
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
