[#HeadersSyncParams-redownload_buffer_size]
= xref:HeadersSyncParams.adoc[HeadersSyncParams]::redownload&lowbar;buffer&lowbar;size
:relfileprefix: ../
:mrdocs:

Minimum number of validated headers to accumulate in the redownload buffer before feeding them into the permanent block index&period;

== Synopsis

Declared in `&lt;kernel&sol;chainparams&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
size&lowbar;t redownload&lowbar;buffer&lowbar;size = &lcub;0&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
