[#HTTPServer-SetMaxConnections]
= xref:HTTPServer.adoc[HTTPServer]::SetMaxConnections
:relfileprefix: ../
:mrdocs:

Set the maximum amount of connected HTTPClients (&hyphen;rpcmaxconnections)

== Synopsis

Declared in `&lt;httpserver&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
SetMaxConnections(int max&lowbar;conn);
----

== Parameters

[cols="1,4"]
|===
| Name| Description
| *max&lowbar;conn*
| Maximum number of concurrent client connections&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
