[#HTTPServer-GetListeningSocketCount]
= xref:HTTPServer.adoc[HTTPServer]::GetListeningSocketCount
:relfileprefix: ../
:mrdocs:

Get the number of sockets the server is bound to and listening on

== Synopsis

Declared in `&lt;httpserver&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
size&lowbar;t
GetListeningSocketCount() const;
----

== Return Value

The count of active listening sockets&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
