[#GetUptime]
= GetUptime
:mrdocs:

Monotonic uptime (not affected by system time changes)&period;

== Synopsis

Declared in `&lt;common&sol;system&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
SteadyClock::duration
GetUptime();
----

== Return Value

The duration the process has been running&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
