[#GetSerializeSize]
= GetSerializeSize
:mrdocs:

Return the number of bytes the serialization of an object would occupy&period;

== Synopsis

Declared in `&lt;serialize&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
template&lt;typename T&gt;
uint64&lowbar;t
GetSerializeSize(T const& t);
----

== Return Value

The number of bytes its serialization would occupy&period;

== Parameters

[cols="1,4"]
|===
| Name| Description
| *t*
| The object whose serialized size is measured&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
