[#GetMockTime]
= GetMockTime
:mrdocs:

For testing&period;

== Synopsis

Declared in `&lt;util&sol;time&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
std::chrono::seconds
GetMockTime();
----

== Return Value

The currently configured mock time, or zero when mocking is disabled&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
