[#G_TRANSLATION_FUN]
= G&lowbar;TRANSLATION&lowbar;FUN
:mrdocs:

Global translation function, set by the GUI and null when no translation is available&period;

== Synopsis

Declared in `&lt;util&sol;translation&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
extern
xref:TranslateFn.adoc[TranslateFn] const G&lowbar;TRANSLATION&lowbar;FUN;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
