[#FormatISO8601DateTime]
= FormatISO8601DateTime
:mrdocs:

ISO 8601 formatting is preferred&period; Use the FormatISO8601&lcub;DateTime,Date&rcub; helper functions if possible&period;

== Synopsis

Declared in `&lt;util&sol;time&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
std::string
FormatISO8601DateTime(int64&lowbar;t nTime);
----

== Return Value

The timestamp formatted as an ISO 8601 date and time string&period;

== Parameters

[cols="1,4"]
|===
| Name| Description
| *nTime*
| Unix timestamp in seconds&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
