[#ExternalSigner-DisplayAddress]
= xref:ExternalSigner.adoc[ExternalSigner]::DisplayAddress
:relfileprefix: ../
:mrdocs:

Display address on the device&period; Calls &grave;&lt;command&gt; &hyphen;&hyphen;fingerprint &lt;fingerprint&gt; &hyphen;&hyphen;chain &lt;chain&gt; displayaddress &hyphen;&hyphen;desc &lt;descriptor&gt;&grave;&period;

== Synopsis

Declared in `&lt;external&lowbar;signer&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:UniValue.adoc[UniValue]
DisplayAddress(std::string const& descriptor) const;
----

== Return Value

the device response describing the displayed address&period;

== Parameters

[cols="1,4"]
|===
| Name| Description
| *descriptor* [in]
| Descriptor specifying which address to display&period; Must include a public key or xpub, as well as key origin&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
