[#DisconnectResult]
= DisconnectResult
:mrdocs:

Outcome of disconnecting a block from the UTXO set&period;

== Synopsis

Declared in `&lt;validation&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
enum DisconnectResult;
----

== Members

[cols="1,4"]
|===
| Name| Description
| `DISCONNECT&lowbar;OK` 
| All good&period;
| `DISCONNECT&lowbar;UNCLEAN` 
| Rolled back, but UTXO set was inconsistent with block&period;
| `DISCONNECT&lowbar;FAILED` 
| Something else went wrong&period;
|===



[.small]#Created with https://www.mrdocs.com[MrDocs]#
