[#DiagramCheckError]
= DiagramCheckError
:mrdocs:

Reason a feerate diagram comparison could not confirm an improvement&period;

== Synopsis

Declared in `&lt;policy&sol;rbf&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
enum class DiagramCheckError : int;
----

== Members

[cols="1,4"]
|===
| Name| Description
| `UNCALCULABLE` 
| Unable to calculate due to topology or other reason
| `FAILURE` 
| New diagram wasn&apos;t strictly superior
|===



[.small]#Created with https://www.mrdocs.com[MrDocs]#
