[#DEFAULT_TXINDEX]
= DEFAULT&lowbar;TXINDEX
:mrdocs:

Default value for the &hyphen;txindex option (index disabled)&period;

== Synopsis

Declared in `&lt;index&sol;txindex&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr bool DEFAULT&lowbar;TXINDEX = &lcub;false&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
