[#DEFAULT_TOR_SOCKS_PORT]
= DEFAULT&lowbar;TOR&lowbar;SOCKS&lowbar;PORT
:mrdocs:

Default port on which Tor listens for SOCKS connections&period;

== Synopsis

Declared in `&lt;torcontrol&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr uint16&lowbar;t DEFAULT&lowbar;TOR&lowbar;SOCKS&lowbar;PORT = &lcub;9050&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
